Online Implementation of the System Trigger

ffl Depending on the air showers direction and

core location, the arrival time of the Cherenkov light front at the telescopes CTa,CTb,CTc differ.

ffl For trigger purposes an approximation of a flat

Cherenkov light front is used. In this model the timing is independant of the air showers positions (core location), which can be determined only after a full reconstruction of an event.